% EPE2011 article template %

\documentclass[a4paper,11pt,fleqn]{article}
\usepackage{amsmath}
\usepackage{amssymb}
\usepackage{caption}
\usepackage{graphicx}
\usepackage{latexsym}
\usepackage{pslatex}
\usepackage[english]{babel}

\def\thepage{}
\renewcommand\figurename{Fig.}
\renewcommand{\captionsize}{\small}
\setlength{\topmargin}{0mm}
\setlength{\topskip}{-6.5mm}
\setlength{\headheight}{0mm}
\setlength{\headsep}{0mm}
\setlength{\oddsidemargin}{0mm}
\setlength{\evensidemargin}{0mm}
\setlength{\textwidth}{160mm}
\setlength{\textheight}{249mm}
\setlength\abovecaptionskip{6pt}
\setlength\belowcaptionskip{6pt}
\setlength{\mathindent}{10mm}
\renewcommand{\thetable}{\Roman{table}}



\title{\LARGE \bf Template to write a contribution for the EPE2011 conference}

\author{
The author's name\\
THE AUTHOR'S COMPANY\\
Address\\
City, Country\\
Phone: +xx (x) xxx-xxxx\\
Fax: +xx (x) xxx-xxxx\\
Email: Author.Name@Company.com\\
URL: http://www.company.com}
\date{}
\begin{document}

\setlength{\parindent}{0mm}
\baselineskip 10pt

\maketitle



\section*{Acknowledgments}
In this little text, which is optional, you may write your acknowledgements. These acknowledgements should directly follow the author\'s information.

\section*{Keywords}
$<<$Keyword 1$>>$, $<<$Keyword 2$>>$, $<<$Keyword 3$>>$, $<<$Keyword 4$>>$, $<<$Keyword 5$>>$ out of official keywords list. Keywords to be included betweeh $<<$ and $>>$.
\section*{Abstract}
Here, you are requested to write the abstract of your paper. Main ideas, findings, results and conclusions should be introduced in an attractive way.
This abstract should not be more than maximum 20 lines.
\section*{Introduction}
Here, you start to write the real paper. It consist of an introduction, the body of the text with the different paragraphs, including figures, formulae, tables and eventual images, and of course, the conclusion. The full paper should not exceed 10 pages and needs to be sent to EPE Association as a PDF-file. It also should not exceed 1.5 MegaByte.
\section*{Title of the first paragraph}
This is where you start to write the extended paper, including subparagraphs, sub-sub paragraphs, figures, formulae, tables and eventual images. Don't forget that the full paper should not exceed more than 10 pages and that, as you might have noticed by now, a one column format is requested.

\medskip
Between paragraphs you should insert one blank line.

\medskip
References \cite{ref1} should be numbered sequentially \cite{ref2} throughout the text.

\subsection*{Second level paragraph}
This is a sub-section

\subsubsection*{Third level paragraph}
This is a sub-sub-section. This is where you start to write the extended paper, including subparagraphs, sub-sub paragraphs, figures, formulae, tables and eventual images. Don't forget that the full paper should not exceed more than 10 pages and that, as you might have noticed by now, a one column format is requested.



\section*{Lists}
Lists can be shown as follows:
\begin{itemize}\addtolength{\itemsep}{-0.8\baselineskip}
%do not forget to add "\addtolength{\itemsep}{-0.8\baselineskip}" for correct spacing
\item This is a bulleted list
\item This is another item in this list
\end{itemize}
Lists can also be numbered:
\begin{enumerate}\addtolength{\itemsep}{-0.8\baselineskip}
%do not forget to add "\addtolength{\itemsep}{-0.8\baselineskip}" for correct spacing
\item This is a numbered list
\item This is another item in this list
\end{enumerate}

\section*{Equations}
Equations are numbered sequentially:
\begin{equation}
E=\int_0^t U\cdot I\cdot \cos\phi\cdot dt
\end{equation}

\section*{Tables}
Tables are preceded by their caption and numbered sequentially with Roman numerals.
\begin{table}[h!]
\caption{Power levels for charging (230 V)}
\centerline{\begin{tabular}{ccc} \hline
      & Current (A)        & Power (kW)        \\ \hline
Standard & 16   & 3,5  \\
Semi-fast & 32     & 7,0     \\ \hline
\end{tabular}}
\end{table}

\section*{Figures}
Figures are followed by their caption and numbered sequentially with Arabic numerals.

\begin{center} %example
\framebox[100mm][c]
{\bigskip

Place figure here

\bigskip
} %example
\end{center} %example
\begin{figure}[h!]
\caption{Example figure}
\end{figure}

\begin{thebibliography}{99}\setlength{\itemsep}{-2mm}

\small

\bibitem{ref1}
Vanderkeyn Ralf W.: Example of fast switching component, EPE Journal Vol 20 no 5, pp. 48- 56
\bibitem{ref2}
Deboe B. D.: A novel type of grid converter, EPE 2011, paper 0321

\end{thebibliography}


\end{document}
